CREATE TABLE FLOAT8_TBL(f1 float8);

INSERT INTO FLOAT8_TBL(f1) VALUES ('    0.0   ');
INSERT INTO FLOAT8_TBL(f1) VALUES ('1004.30  ');
INSERT INTO FLOAT8_TBL(f1) VALUES ('   -34.84');
INSERT INTO FLOAT8_TBL(f1) VALUES ('1.2345678901234e+200');
INSERT INTO FLOAT8_TBL(f1) VALUES ('1.2345678901234e-200');

CREATE TABLE float8_tbl(f1 float8);

INSERT INTO float8_tbl
SELECT * FROM LOAT8_TBL;

